Title: (Optional) Earn a cardiopulmonary resuscitation (CPR) certification.
Course: Heating, Ventilation, Air Conditioning, and Refrigeration I (17056-I) > Section: Applying Basic Construction Safety Standards (Core Safety)

Earning a CPR certification should be done with a provider recognized by the American Heart Association.

Process/Skill Questions:

- What is the correct way to administer CPR?
- When should CPR be administered?