Title: (Optional) Replace a start or a run capacitor.
Course: Heating, Ventilation, Air Conditioning, and Refrigeration I (17056-I) > Section: Understanding Motors and Controls

Replacement should include using an ohmmeter and ammeter on run capacitors to check the voltage and amperage.

Process/Skill Questions:

- Why is it important to turn off and verify power to the system before replacing a capacitor?
- What PPE should you use when working with capacitors?
- What is the difference between a start capacitor and a run capacitor?
- What is the capacitance rating?
- What causes a capacitor to short out?