Title: Identify emergency first-aid procedures.
Course: Electronics Technology (17101-II) > Section: Applying General Safety Standards (Core Safety)

Identification should include standard first-aid procedures and school policies regarding accidents involving

- bodily fluids
- electrical injuries
- hydraulic injuries
- eye injuries
- falls
- burns.

Process/Skill Questions:

- What steps should be followed when an accident occurs?
- Why is knowing cardiopulmonary resuscitation (CPR) an important skill within the construction trades?
- Why is it important to be certified to administer first aid?
- What first aid must be performed if an open wound is in contact with hydraulic fluid?
- What are the different classifications (i.e., degrees) of electrical burns?