Title: Design circuits containing integrated circuit components.
Course: Electronics Systems II (17106-II) > Section: Working with Amplifiers

Design should include a

- problem statement specifying the desired circuit function
- schematic design and simulation
- verification of operation—breadboarding the circuit, testing, verifying, and describing demonstrated operation.

Process/Skill Questions:

- What operational characteristics should the circuit have?
- How can a schematic or a computer-based simulation represent a circuit’s operation?
- How can a circuit be temporarily constructed for real-world validation of design work?