Title: Test the amplifier circuits.
Course: Electronics Systems II (17106-II) > Section: Working with Amplifiers

Testing should include an analysis of the characteristics, operation, and applications of IC, using

- mathematics
- instrumentation circuits (e.g., construct and test, IC tester or breadboarding with logic probe, oscilloscope, multimeter)
- computer simulation.

Process/Skill Questions:

- How do theoretical, actual, and simulated circuit characteristics differ?
- How can mathematics be used to predict circuit characteristics?
- How can circuit theory be verified, using various test instruments and computer-assisted simulation?
- How can test instruments facilitate electronic equipment troubleshooting?