Title: Demonstrate the use of electronic lab equipment.
Course: Electronics Systems II (17106-II) > Section: Introducing the Electronics Industry

Demonstration should include

- acceptable training and performance with all tools, machines, equipment, and supplies (including care and maintenance of all items)
- monitored/supervised performance during each activity
- ability to locate posted safety rules, precautions, and first-aid and emergency instructions
- wearing personal protective equipment (PPE), when necessary, and to adhere to injury-reporting protocols
- discussing the necessary protocols when working with  alternating current (AC) and direct current (DC).

Process/Skill Questions:

- Why is safety important in the lab and in the workplace?
- What safety precautions should be taken when using hand tools, machines, equipment, and chemicals in a lab?
- What safety precautions and responsibilities should be considered for various electronics?
- What safety precautions are used when operating an AC generator?