Title: (Optional) Troubleshoot final drives and differential systems.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing the Powertrain

Troubleshooting should include all safety procedures, protocols, instructor and manufacturer specifications and guidelines, and

- diagnosing
- disassembling
- reassembling

final drives and differential systems, using appropriate tools, equipment, and repair manuals.

Process/Skill Questions:

- What is a differential?
- What determines the differential output ratio?