Title: Explain the operation of the charging circuit.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing the Charging Circuit

Explanation should include the components of the charging circuit and the function of each.

Process/Skill Questions:

- How do amps and volts relate to battery performance?
- How can we properly test battery amperage?
- What situations drain batteries of voltage?