Title: Demonstrate safe use of maintenance tools and equipment.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Performing General Mechanical Maintenance

Demonstration should include

- using required PPE
- identifying hazards associated with given maintenance procedures, tools, and equipment
- identifying OSHA color codes for marking physical hazards
- verifying all tools and equipment are in good operating condition, according to OSHA standards
- using required safety devices (e.g., guards and/or shields in place, tool rests adjusted)
- using language, symbols, and procedures related to the operation of equipment
- operating hand tools, power tools, equipment, and machinery following all safety procedures according to manufacturer specifications, industry-recommended practices, and instructor guidelines.

Process/Skill Questions:

- Why is it important to follow safety procedures with equipment?
- Why is it important to report any damaged or broken equipment to the instructor?