Title: Troubleshoot glow plugs on diesel engines.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing the Starting Circuit

Troubleshooting should include

- wearing required PPE
- identifying why the glow plug(s) are not working
- making necessary adjustments or repairs using appropriate tools, equipment, and repair manuals
- following all required safety procedures, guidelines, protocols, and manufacturer specifications for glow plug diagnostic procedures.

Process/Skill Questions:

- What function do glow plugs have?
- What are some symptoms of bad glow plugs?