Title: Repair the power unit.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Testing, Servicing, and Repairing the Power Unit

Repair should include

- wearing required PPE
- cleaning, troubleshooting, and replacing parts when necessary, using appropriate tools, equipment, and repair manuals
- following all safety procedures, protocols, and instructor and manufacturer specifications and guidelines for repairing the power unit
- considering the economic feasibility of repair versus replacement.

Process/Skill Questions:

- When might it make more sense to replace a power unit rather than repair one?
- How is a power unit removed?