Title: Explain safety considerations when working with electrical systems and in proximity to electricity.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing Electrical Systems

Explanation should include

- describing the functions of the electrical system and the importance of servicing and maintaining the electrical system
- knowing the risks of electrical hazards and electricity-related injuries when working with or on agricultural tools, machinery, and equipment
  - electric shocks
  - electrical burns
  - electrocution
  - falls caused by shocks, burns, and electrocution

- identifying equipment used to test electrical circuits
- describing safe working conditions
- demonstrating safe work habits according to industry standards and instructor's guidelines.

Process/Skill Questions:

- What guidelines should always be followed to prevent electrical shock?
- How can a fire extinguisher rated for electrical fires be identified?
- What should a visual pre-use safety inspection consist of?