Title: (Optional) Flush radiator.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing the Cooling System

Procedures should include

- using instructor guidelines and industry-recommended procedures to clean, drain, and properly refill a radiator
- wearing required PPE
- following all required safety procedures, guidelines, and protocols for servicing radiators.

Process/Skill Questions:

- What precautions should be used when disposing of coolant?
- What steps should be followed when flushing a cooling system?