Title: Follow general safety when servicing batteries.
Course: Agricultural Power Systems, Advanced (18402-II) > Section: Maintaining and Servicing Storage Battery

Procedure should include

- wearing required PPE for servicing batteries
- explaining hazards associated with servicing batteries
- inspecting the battery for any damage
- disconnecting the battery ground wire before charging, using appropriate tools, equipment, repair manuals
- following all safety procedures, guidelines, protocols, and manufacturer specifications for servicing batteries.

Process/Skill Questions:

- Why would a battery need to be serviced?
- Why is it important to wear eye protection when working with batteries?
- What is a hydrometer?