Title: Explain how common electronic and other electrical devices work.
Course: Electronics Systems I (17106-36) > Section: Introducing Circuit Components

Explanation should include identifying the following devices:

- Lamps
- Motors
- Light-emitting diodes (LED)
- Speakers
- Capacitors
- Inductors
- Diodes

It also includes identifying common schematic symbols as noted.

Process/Skill Questions:

- How does a lamp emit light?
- How does a motor work?
- How does an LED work?
- How do speakers work?

Teacher Resource:

Electrical Symbols & Electronic Symbols, RapidTables