Title: Demonstrate the direction of current flow in DC circuits.
Course: Electronics Systems I (17106-36) > Section: Introducing the Structure of Electricity

Demonstration should include an understanding of the characteristics, operation, and application of simple direct-current circuits and theory.

Process/Skill Questions:

- What is direct current? What are the characteristics of DC circuits?
- What types of voltage and power sources are associated with DC circuits?
- What are examples of DC circuits and applications?
- What mathematical concepts can be applied to better understand the characteristics of DC circuits?
- What is the difference between conventional theory and electronic load theory?