Title: Replace downspout eaves.
Course: Building Management III (16103-III) > Section: Maintaining Interiors and Exteriors

Replacement should include the following steps:

- Remove the old gutter.
- Measure the fascia.
- Assemble the entire length of guttering on the ground.
- Pop rivet sections together.
- Cut out the hole for the downspout.
- Seal all seams with waterproofing material.
- Attach a string to the fascia to show the pitch toward the downspout.
- Place hangers onto the fascia.
- Place the gutter into position.
- Assemble the downspout sections.
- Install the hanger bands.

Process/Skill Questions:

- What safety precautions should be followed when replacing downspout eaves?
- What are some factors that may account for the need to replace gutters and downspouts?
- What tools and materials are required for replacing gutters and downspouts?