Title: Install a shower.
Course: Building Management III (16103-III) > Section: Performing Plumbing Maintenance

Installation should include the following steps:

- Assemble tools and equipment.
- Place thread-seal tape on the control valve heads and the shower pipe stub.
- Attach the shower head and valve to the shower pipe.
- Slide the escutcheon onto the shower pipe.
- Attach the shower pipe end to the roughed-in wall stub.
- Press the escutcheon against the wall covering hole and stub.
- Place the escutcheon over the water control valves and press it against the wall.
- Attach the control valve handles with a screwdriver.

Process/Skill Questions:

- What are the relevant safety precautions/procedures for installing a shower?