Title: Interpret aircraft electrical circuit diagrams, including solid-state devices and logic functions.
Course: Aviation Maintenance Technology I (20114-I) > Section: Performing Basic Electricity Tasks

Interpretation should include

- locating and isolating electrical parts and systems
- determining the function of each of these parts and systems
- determining how these parts and systems work in conjunction with each other and other systems in the aircraft
- troubleshooting and isolating problems in an aircraft electrical system.

ACS:

AM.I.A.K25
AM.I.A.S7

Process/Skill Questions:

- How would the mechanic isolate an electrical part in a system for troubleshooting?
- How does one determine how the parts work together in a system?