Title: Measure voltage, current, resistance, and continuity.
Course: Aviation Maintenance Technology I (20114-I) > Section: Performing Basic Electricity Tasks

Procedure should include

- using a multimeter and capacitance checker
- documenting findings
- troubleshooting problems related to the circuit.

ACS:

AM.I.A.K9
AM.I.A.K10
AM.I.A.K11
AM.I.A.R1
AM.I.A.K9
AM.I.A.S2
AM.I.A.S3
AM.I.A.S4
AM.I.A.S8

Process/Skill Questions:

- How is continuity in a circuit determined?
- How is voltage in circuit measured?