Title: Describe the physical and chemical properties of each of the four types of fire extinguishing agents.
Course: Aviation Maintenance Technology I (20114-I) > Section: Providing Ground Operations and Servicing

Description should include

- water—for class-A fires
- carbon dioxide (CO2)—for class-B or -C fires
- halogenated hydrocarbons (Halons)—for class-A, -B, or -C fires
- specialized dry powder—for class-D fires.

ACS:

AM.I.G.S10

Process/Skill Questions:

- How does one determine which extinguishing agent to use?
- What are the drawbacks/hazards associated with various fire extinguishers?
- What can happen if the wrong extinguishing agent is used on a fire?