Title: Identify manufacturer’s manuals and related publications to accomplish specific maintenance tasks.
Course: Aviation Maintenance Technology I (20114-I) > Section: Interpreting Maintenance Publications, Forms, and Records

Identification should include

- locating ATA iSPEC 2200
- describing ATA iSPEC 2200—contains format and content guidelines for technical manuals written by aviation manufacturers and suppliers used by airlines and other segments of the industry in the maintenance of their respective products
- using ATA iSPEC 2200 to find correct maintenance procedures for a given maintenance task.

ACS:

A.M.I.I.K11
A.M.I.I.K13

Process/Skill Questions:

- What is the purpose of an ATA code?
- Where are ATA codes located?