Title: Identify tools, their care and maintenance needs, functions, and handling.
Course: Aviation Maintenance Technology I (20114-I) > Section: Following Tool and Equipment Safety and Care Guidelines

Identification should include

- naming hand tools, power equipment, and additional lab equipment used in aviation maintenance
- selecting the appropriate tool for the job
- following manufacturer guidelines and industry standards or recommendations for cleaning, maintenance, and storage
- calibrating tools.

ACS:

AM.I.E.K1
AM.I.E.K4

Process/Skill Questions:

- Why is tool calibration important?
- Why is it important to maintain tools?
- What tools require calibration?