Title: Demonstrate CPR and use of an AED.
Course: Sterile Processing Technician II (14201-II) > Section: Providing First Aid and Emergency Care

Demonstration should include situations involving

- adult patient
- child patient
- infant patient
- one- and two-person CPR
- obstructed airway.

Student must be certified in Basic Life Support for Healthcare Providers (BLS) prior to administering CPR.

Process/Skill Questions:

- What is meant by the compression airway breathing (CAB) of CPR? Why is each important?
- What is the BLS chain of survival for adults? What is the BLS pediatric chain of survival?
- Why must a person be certified in BLS prior to administering CPR?