Title: Demonstrate ability to successfully complete selected practice examinations.
Course: Sterile Processing Technician II (14201-II) > Section: Preparing for Industry Certification

Demonstration should include completing practice examinations that gauge the applicant’s readiness for formal industry certification testing.

Process/Skill Questions:

- Which practice exams are most applicable to the chosen certification exam?
- What format is used for the practice exams?