Title: Complete an industry certification examination representative of skills learned in this course.
Course: Sterile Processing Technician II (14201-II) > Section: Preparing for Industry Certification

Completion should include an examination score deemed passing by the testing organization. State-approved examinations (e.g., Certified Registered Central Service Technician exam) for this course are listed on the CTE Resource Center website.

Students should be encouraged to attain industry certification as evidence of their sterile processing technician skill level and general employability.

Process/Skill Questions:

- Where are credentials recorded?
- How often are credentials renewed?