Title: (Optional) Complete an industry certification examination representative of skills learned in this course.
Course: Office Specialist I - Preparation (12004-I) > Section: Preparing for Industry Certification

Completion should include passing any of the state-approved examinations for this course as listed on the listed on the CTE Resource Center website (e.g., Microsoft Office Specialist [MOS], IC3 Digital Literacy Certification, Workplace Readiness Skills for the Commonwealth).

Students should be encouraged to attain industry certification as evidence of their skill level and general employability.