Title: (Optional) Identify testing skills and strategies for a certification examination.
Course: Office Specialist I - Preparation (12004-I) > Section: Preparing for Industry Certification

Identification should include

- conducting Internet research
- reviewing materials from exam and practice-exam publishers
- interviewing certified instructors and/or industry-certified professionals.