Title: Create circuits.
Course: Technology of Robotic Design (21009-18) > Section: Exploring Electrical Concepts

Creation should include components connected by breadboard or solder for a working circuit.

Process/Skill Questions:

- What components are needed to create a closed circuit?
- What components help control current in a circuit?