Title: Set up a control room.
Course: Audio Production and Recording I (05123-IA) > Section: Setting Up a Studio and Control Room

Setup should include

- speaker placement
- talk-back
- studio channel selection
- audio interface (e.g., Apollo, Scarlett).

Process/Skill Questions:

- What is the function of phantom power (48v)?
- How can speaker setup within the control room affect critical listening?
- What types of acoustic treatment could benefit the production of sound in the control room?