Title: Maintain the lab and workspace.
Course: Motorsports Technology III (20105-III) > Section: Applying Safety Practices

Maintenance should include organizing the lab (e.g., tools, work area, and storage) daily, according to customer service standards and customer and worker safety. It should also include managing supplies and inventory in an efficient manner.

Maintenance duties should include

- keeping the work area clean and safe for work
- keeping tools, workbenches, and manual equipment clean and in safe working order
- addressing safety hazards.

Process/Skill Questions:

- Why is it important to maintain a clean and orderly work area?
- What are safety advantages that result from good housekeeping?
- How can organization improve one's overall work efficiency?