Title: Assemble the electrical systems.
Course: Motorsports Technology III (20105-III) > Section: Assembling High-Performance Vehicle

Assembly should include

- collecting electrical parts and equipment
- installing electrical parts and equipment
- checking the routing of electrical parts
- checking the continuity of electrical parts
- securing wires.

Process/Skill Questions:

- What does checking for continuity tell us?
- Why is proper routing of wires important?
- What is the proper way to secure all electrical wires?