Title: Demonstrate safety inspections.
Course: Motorsports Technology III (20105-III) > Section: Demonstrating Manual Oxyfuel Gas Cutting (OFC)

Demonstration should include a daily visual inspection of oxyfuel gas cutting (OFC) equipment and accessories (e.g., protective clothing, hand tools, and base metal), according to the instructor's policy.

Process/Skill Questions:

- What pressure should regulators be set to?
- Why is safety important when using OFC?
- Why should one bleed down the lines and regulators on OFC equipment?