Title: Maintain the work environment.
Course: Legal Administration (12008-36) > Section: Managing Office Activities

Maintenance should include

- following protocols for maintaining a secure work environment
- keeping a neat and organized work area with necessary supplies and materials
- preventing waste and adhering to environmental considerations (e.g., recycling, printing volume)
- handling sensitive and confidential information.