Title: Process the physical properties of a solution/reagent.
Course: Biomedical Technician (14900) > Section: Performing Basic Laboratory Skills

Process should include monitoring, adjusting, and maintaining the physical properties of a solution and/or reagent and includes the

- parameters of pH
- temperature
- specific gravity
- light exposure
- expiration
- other labeling requirements.

Process/Skill Questions:

- Will the physical parameters of a solution or reagent remain constant with storage? Why, or why not?
- How could changes in the physical properties of a solution affect research results?
- Where would the biomedical technician obtain information on proper storage conditions for a reagent or solution?
- Why should a reagent not be used after the expiration date?
- How would the biomedical technician monitor and adjust parameters for a specific solution or reagent?