Title: Research career pathways in biomedical technology.
Course: Biomedical Technician (14900) > Section: Exploring Professional Choices

Research should include

- educational requirements
- career benefits and drawbacks
- employment outlook, salary, and job descriptions.

Many websites offer career exploration resources, including the U.S. Bureau of Labor Statistics Occupational Outlook Handbook.

Process/Skill Questions:

- What colleges or universities offer programs in biomedical technology in Virginia? Elsewhere?
- What classes should a student take in high school to prepare for a career in biomedical technology?
- How have initiatives, such as the Homeland Security Act of 2002, affected job opportunities in biomedical technology?
- How has television affected job opportunities in biomedical technology?