Title: Explain the process for making stock reagents and solutions.
Course: Biomedical Technician (14900) > Section: Performing Basic Laboratory Skills

Explanation should include

- the steps involved in the process for making stock reagents and solutions, to include weighing and measuring
- the importance of accuracy and precision throughout the process
- dilution techniques and the purpose for reagents.

Process/Skill Questions:

- How would a biomedical technician mix a working solution from a 10X concentrated solution? What is this solution used for?
- What dilution techniques are commonly used when mixing reagents and solutions?
- What is the procedure for weighing and measuring when making stock reagents and solutions?