Title: Identify basic structures of microorganisms and cells.
Course: Biomedical Technician (14900) > Section: Performing Basic Microbiology Skills

Identification should include distinguishing and labeling microorganism and cell components (e.g., bacteria, fungi, parasites, viruses, red cells, white cells, platelets, epithelial cells, bone cells), including organelles and structures.

Process/Skill Questions:

- What is the function of each structure for given microorganism and cell structures?
- What are the applications of identifying basic microorganism and cell structures? What are the industrial, medical, and forensic applications?