Title: Perform protein detection and separation techniques.
Course: Biomedical Technician (14900) > Section: Applying Chemical Techniques for Biological Analysis

Performance should include

- giving a definition of protein
- giving a description of its role in a cell
- demonstrating the steps in detection and separation (including gel electrophoresis)
- explaining why the process of protein detection and separation is important in the biomedical field.

Process/Skill Questions:

- What does each band represent in protein detection and separation?
- What are the applications for protein electrophoresis?
- How does one identify the protein from gel electrophoresis?