Title: Maintain a safe working environment.
Course: Mechatronics I (13901-I) > Section: Applying Basic Safety Standards for Mechanics

Maintenance should be ongoing and result in identifying potential hazards on a job site or in the lab, such as unstable or improperly installed electrical components, electrical hazards, job-site debris, improperly stored materials, and air-quality hazards. When present, hazards must be remedied by appropriate measures in compliance with school and instructor guidelines.

Process/Skill Questions:

- What are examples of job-site hazards?
- Why is it important to maintain safe work space standards on a job site?
- Why is it important to store materials and tools in their proper places?