Title: Identify emergency first-aid procedures.
Course: Mechatronics I (13901-I) > Section: Applying Basic Safety Standards for Mechanics

Identification should include procedures for accidents involving

- bodily fluids
- electrical injuries
- eye injuries
- hydraulic fluid injection injury
- falls
- burns.

Process/Skill Questions:

- What steps should be followed in the event of an accident?
- Why is the knowledge of cardiopulmonary resuscitation (CPR) and automated external defibrillator (AED) use important in the electrical trades?
- Why is it important to be certified to administer first aid?
- What are the different degrees of electrical burns?
- What is CPR/AED?