Title: Identify machine elements.
Course: Mechatronics I (13901-I) > Section: Introducing Mechanical Systems

Identification should include elements such as

- fasteners
- bearings
- couplings
- gears
- shafts
- springs
- sheaves
- sprockets
- shims.

Process/Skill Questions:

- What is the importance of lubricating machine elements?
- What forces would each component experience (e.g. axial, radial, torque)?
- What is the difference between a gear and a sprocket?