Title: Maintain safe working practices around production equipment.
Course: Production Systems (13101-18) > Section: Practicing Safety

Maintenance should include

- identifying potential hazards of each piece of equipment
- demonstrating safe work habits with each type of equipment.

Process/Skill Questions:

- What are examples of the risks of unsafe behavior around production equipment?
- How would safety rules help prevent these risks?