Title: Discuss the safety plan.
Course: Technology and Engineering Foundations (18 weeks) (21003-18) > Section: Understanding Lab and Workplace Safety

Discussion should include

- hazard identification
- hazard prevention
- emergency procedures
- Occupational Safety and Health Administration (OSHA) standards
- examples of workplace safety.

Process/Skill Questions:

- Why should there always be a safety plan in place?
- What types of personal protective equipment (PPE) are used in different production/manufacturing businesses?
- Why and for whom should safety be a priority?
- What are some examples of potential hazards in the work environment?
- What are some tools that can be used to assess the work environment for potential hazards?
- What is OSHA, and how has it changed industry since its inception?
- Who is responsible for safety in a production environment?