Title: Describe engineering practices (habits of mind).
Course: Technology and Engineering Foundations (18 weeks) (21003-18) > Section: Exploring Technology and Engineering Core Concepts

Description should include

- attention to ethics
- collaboration
- communication
- creativity
- critical thinking
- making and doing
- optimism
- systems thinking.

Process/Skill Questions:

- What is meant by  engineering habits of mind?
- Why is optimism an important characteristic of engineering and design?